/*
Navicat MySQL Data Transfer

Source Server         : localhost
Source Server Version : 50717
Source Host           : localhost:3306
Source Database       : easyiot

Date: 2018-11-01 22:37:17
*/

SET FOREIGN_KEY_CHECKS=0;

-- ---------------------------
-- ----------------------------
-- Records of pro_dictionary_info
-- ----------------------------
INSERT INTO pro_dictionary_info VALUES ('1', '', 'RESPONSE_CODE', null, '1', '返回状态', null, null, '0', '2018-05-16 15:36:53');
INSERT INTO pro_dictionary_info VALUES ('2', 'RESPONSE_CODE', 'OK', '1', '2', 'OK', null, null, '0', '2018-05-10 14:07:28');
INSERT INTO pro_dictionary_info VALUES ('3', 'RESPONSE_CODE', 'ERROR', '1', '3', 'ERROR', null, null, '0', '2018-05-10 13:50:41');
INSERT INTO pro_dictionary_info VALUES ('4', 'RESPONSE_CODE', 'NO_DATA', '1', '4', '无数据', null, null, '0', '2018-05-10 13:51:00');
INSERT INTO pro_dictionary_info VALUES ('5', 'RESPONSE_CODE', 'NO_PARAM', '1', '5', '缺少参数', null, null, '0', '2018-05-10 13:51:35');
INSERT INTO pro_dictionary_info VALUES ('9', 'RESPONSE_CODE', 'EXEC_FAIL', '1', '9', '执行错误', null, null, '0', '2018-05-10 14:07:13');
INSERT INTO pro_dictionary_info VALUES ('11', 'RESPONSE_CODE', 'NO_AUTHORIZATION', '1', '11', '无权限', null, null, '0', '2018-05-11 11:04:48');
INSERT INTO pro_dictionary_info VALUES ('12', 'RESPONSE_CODE', 'USER_EXIST', '1', '12', '用户已存在', null, null, '0', '2018-05-11 11:05:32');
INSERT INTO pro_dictionary_info VALUES ('13', 'RESPONSE_CODE', 'USER_NOT_EXISTS', '1', '13', '用户不存在', null, null, '0', '2018-05-11 11:05:59');
INSERT INTO pro_dictionary_info VALUES ('14', 'RESPONSE_CODE', 'USERNAME_OR_PASSWORD_ERROR', '1', '14', '用户名或密码错误', null, null, '0', '2018-05-18 19:43:52');
INSERT INTO pro_dictionary_info VALUES ('62', 'RESPONSE_CODE', 'ACTIVE_CODE_OVERDUE', '1', '62', '激活码已过期', null, null, '0', '2018-05-19 09:49:37');
INSERT INTO pro_dictionary_info VALUES ('63', 'RESPONSE_CODE', 'ACTIVED', '1', '63', '账户已激活', null, null, '0', '2018-05-19 09:50:06');
INSERT INTO pro_dictionary_info VALUES ('65', 'RESPONSE_CODE', 'NO_ACTIVE_CODE', '1', '65', '激活码不存在', '', null, '0', '2018-06-10 22:30:13');
INSERT INTO pro_dictionary_info VALUES ('66', 'RESPONSE_CODE', 'NAME_EXIST', '1', '66', '用户名已存在', '', null, '0', '2018-06-11 10:34:18');
INSERT INTO pro_dictionary_info VALUES ('67', 'RESPONSE_CODE', 'EMAIL_EXIST', '1', '67', '邮件已存在', '', null, '0', '2018-06-11 10:34:31');
INSERT INTO pro_dictionary_info VALUES ('68', 'RESPONSE_CODE', 'PHONE_EXIST', '1', '68', '手机号码已存在', '', null, '0', '2018-06-11 10:34:41');
INSERT INTO pro_dictionary_info VALUES ('93', 'RESPONSE_CODE', 'VALIDATER_ALLER', '1', '93', '验证码已超过5条', '', NULL, '0', '2019-03-12 18:43:12');
INSERT INTO pro_dictionary_info VALUES ('94', 'RESPONSE_CODE', 'CODE_TIME_ERROR', '1', '94', '验证码超时', '', NULL, '0', '2019-03-12 19:28:55');
INSERT INTO pro_dictionary_info VALUES ('95', 'RESPONSE_CODE', 'CODE_ERROR', '1', '95', '验证码错误', '', NULL, '0', '2019-03-12 19:28:29');
INSERT INTO pro_dictionary_info VALUES ('70', 'RESPONSE_CODE', 'DEVICE_CODE_EXIST', '1', '70', '设备码已存在', '', null, '0', '2018-06-11 14:52:32');
INSERT INTO pro_dictionary_info VALUES ('86', 'RESPONSE_CODE', 'VIDEO_NAME_REPEAT', '1', '86', '项目名称重复', '', NULL, '0', '2018-11-10 20:32:02');
INSERT INTO pro_dictionary_info VALUES ('380', 'RESPONSE_CODE', 'DEVICE_CODE_NOT_EXIST', '1', '380', '设备号不存在', '', NULL, '0', '2020-02-19 20:32:02');
INSERT INTO pro_dictionary_info VALUES ('381', 'RESPONSE_CODE', 'DEVICE_CODE_USED', '1', '381', '设备号已绑定', '', NULL, '0', '2020-03-18 20:32:02');

INSERT INTO pro_dictionary_info VALUES ('6', '', 'USER_TYPE', null, '6', '用户类型', null, null, '0', '2018-05-10 13:51:53');
INSERT INTO pro_dictionary_info VALUES ('7', 'USER_TYPE', 'NORMAL', '6', '7', '普通用户', null, null, '0', '2018-05-10 13:52:27');
INSERT INTO pro_dictionary_info VALUES ('8', 'USER_TYPE', 'MANAGER', '6', '8', '管理员', null, null, '0', '2018-05-10 13:52:37');
INSERT INTO pro_dictionary_info VALUES ('10', 'USER_TYPE', 'SUPER', '6', '10', '超级管理员', null, null, '0', '2018-09-02 09:17:22');

INSERT INTO pro_dictionary_info VALUES ('15', '', 'DEVICE_STATUS', null, '15', '设备状态', null, null, '0', '2018-05-14 14:55:12');
INSERT INTO pro_dictionary_info VALUES ('16', 'DEVICE_STATUS', 'ONLINE', '15', '16', '在线', null, null, '0', '2018-05-14 14:55:30');
INSERT INTO pro_dictionary_info VALUES ('17', 'DEVICE_STATUS', 'OFFLINE', '15', '17', '设备已离线', null, null, '0', '2018-09-02 09:14:18');
INSERT INTO pro_dictionary_info VALUES ('18', 'DEVICE_STATUS', 'UNCONTECT', '15', '18', '未连接', null, null, '0', '2018-05-14 14:56:24');
INSERT INTO pro_dictionary_info VALUES ('19', 'DEVICE_STATUS', 'FAILURE', '15', '19', '故障', null, null, '0', '2018-05-14 16:28:21');

INSERT INTO pro_dictionary_info VALUES ('20', '', 'SENSOR_UNIT', null, '20', '传感器单位', null, null, '0', '2018-05-15 16:44:33');
INSERT INTO pro_dictionary_info VALUES ('21', 'SENSOR_UNIT', 'TEMPERATURE', '20', '21', '°C', null, null, '0', '2018-05-15 16:45:13');
INSERT INTO pro_dictionary_info VALUES ('22', 'SENSOR_UNIT', 'HUMIDITY', '20', '22', 'RH', null, null, '0', '2018-05-15 16:45:13');
INSERT INTO pro_dictionary_info VALUES ('23', 'SENSOR_UNIT', 'BEAM', '20', '23', 'Lux', null, null, '0', '2018-05-15 16:45:47');
INSERT INTO pro_dictionary_info VALUES ('69', 'SENSOR_UNIT', 'RED_ALARM', '20', '69', '有人/无人', '1:有人,0:正常', null, '0', '2018-06-11 13:09:15');
INSERT INTO pro_dictionary_info VALUES ('72', 'SENSOR_UNIT', 'DEVICE_UNIT_2', '20', '71', '打开/关闭', '1:打开,0:关闭', null, '0', '2018-09-02 09:56:28');
INSERT INTO pro_dictionary_info VALUES ('73', 'SENSOR_UNIT', 'PPM', '20', '73', 'ppm', '', null, '0', '2018-09-02 10:28:33');
INSERT INTO pro_dictionary_info VALUES ('74', 'SENSOR_UNIT', 'DENSITY', '20', '74', 'mg/m3', '', null, '0', '2018-10-24 20:53:47');
INSERT INTO pro_dictionary_info VALUES ('75', 'SENSOR_UNIT', 'PERCENT', '20', '75', '%', '', null, '0', '2018-10-24 20:52:06');
INSERT INTO pro_dictionary_info VALUES ('76', 'SENSOR_UNIT', 'SPEED', '20', '76', 'm/s', '', null, '0', '2018-10-24 20:53:38');
INSERT INTO pro_dictionary_info VALUES ('77', 'SENSOR_UNIT', 'PA', '20', '77', 'pa', '', null, '0', '2018-10-24 20:54:02');
INSERT INTO pro_dictionary_info VALUES ('91', 'SENSOR_UNIT', 'LONLAT', '20', '91', '°', '', NULL, '0', '2019-02-28 23:02:03');
INSERT INTO pro_dictionary_info VALUES ('250', 'SENSOR_UNIT', 'WINDUNIT', '20', '250', '风向', '', NULL, '0', '2019-02-28 23:02:03');

INSERT INTO pro_dictionary_info VALUES ('24', '', 'SENSOR_TYPE', null, '24', '传感器类型', null, null, '0', '2018-05-15 16:46:16');
INSERT INTO pro_dictionary_info VALUES ('25', 'SENSOR_TYPE', 'DATA_CONTINUITY', '24', '25', '数值类型', null, null, '0', '2018-05-15 16:50:16');
INSERT INTO pro_dictionary_info VALUES ('26', 'SENSOR_TYPE', 'DATA_DISCRETE', '24', '26', '状态类型', null, null, '0', '2018-05-15 16:50:31');
INSERT INTO pro_dictionary_info VALUES ('27', 'SENSOR_TYPE', 'DATA_SWITCH', '24', '27', '开关类型', null, null, '0', '2018-05-15 16:50:51');
INSERT INTO pro_dictionary_info VALUES ('90', 'SENSOR_TYPE', 'POSITION', '24', '90', 'GPS类型', '', NULL, '0', '2019-02-28 22:57:37');
INSERT INTO pro_dictionary_info VALUES ('98', 'SENSOR_TYPE', 'DISPLAY', '24', '98', '显示型', '', NULL, '1', '2019-04-03 22:05:01');
INSERT INTO pro_dictionary_info VALUES ('190', 'SENSOR_TYPE', 'REFLASH', '24', '190', '点动型', '', NULL, '1', '2019-04-03 22:05:01');


INSERT INTO pro_dictionary_info VALUES ('28', '', 'TRIGGER_CONDITION_TYPE', null, '28', '触发条件类型', null, null, '0', '2018-05-16 12:35:23');
INSERT INTO pro_dictionary_info VALUES ('29', 'TRIGGER_CONDITION_TYPE', 'OVERTOPX', '28', '29', '数值高于{X}', null, null, '0', '2018-05-16 12:37:41');
INSERT INTO pro_dictionary_info VALUES ('30', 'TRIGGER_CONDITION_TYPE', 'UNDERY', '28', '30', '数值低于{Y}', null, null, '0', '2018-05-16 12:37:36');
INSERT INTO pro_dictionary_info VALUES ('31', 'TRIGGER_CONDITION_TYPE', 'XY_OVERTIME', '28', '31', '数值在{X}和{Y}之间', null, null, '0', '2018-05-16 12:37:21');
INSERT INTO pro_dictionary_info VALUES ('32', 'TRIGGER_CONDITION_TYPE', 'EQUAL', '28', '32', '数值={X}', null, null, '0', '2018-05-16 12:39:08');
INSERT INTO pro_dictionary_info VALUES ('33', 'TRIGGER_CONDITION_TYPE', 'OVERTOPX_OVERTIME', '28', '33', '数值超过{M}分钟高于{X}', null, null, '0', '2018-05-16 12:39:59');
INSERT INTO pro_dictionary_info VALUES ('34', 'TRIGGER_CONDITION_TYPE', 'UNDERY_OVERTIME', '28', '34', '数值超过{M}分钟低于{X}', null, null, '0', '2018-05-16 12:40:24');
INSERT INTO pro_dictionary_info VALUES ('189', 'TRIGGER_CONDITION_TYPE', 'EXCEPTION_DATA_SOLVE', '28', '189', '异常数据{x}~{Y}外过滤', null, null, '0', '2018-05-16 12:40:24');
INSERT INTO pro_dictionary_info VALUES ('280', 'TRIGGER_CONDITION_TYPE', 'GATEWAY_STATE_MONITOR', '28', '280', '超过{M}分钟无数据', null, null, '0', '2020-02-09 12:40:24');
INSERT INTO pro_dictionary_info VALUES ('110', 'TRIGGER_CONDITION_TYPE', 'SENSOR_VALUE_MONITOR', '28', '110', '超过{M}分钟数据无变化', null, null, '1', '2020-02-09 12:40:24');
INSERT INTO pro_dictionary_info VALUES ('111', 'TRIGGER_CONDITION_TYPE', 'PEROID_MAX_OVER_PERCENT', '28', '111', '{X}个值内,超过最大值{Y}%', null, null, '1', '2020-02-09 12:40:24');
INSERT INTO pro_dictionary_info VALUES ('112', 'TRIGGER_CONDITION_TYPE', 'PEROID_MIN_OVER_PERCENT', '28', '112', '{X}个值内,低于最小值{Y}%', null, null, '1', '2020-02-09 12:40:24');


INSERT INTO pro_dictionary_info VALUES ('35', '', 'ALARM_FLAG', null, '35', '报警开关或开关', null, null, '0', '2018-05-17 13:24:44');
INSERT INTO pro_dictionary_info VALUES ('36', 'ALARM_FLAG', 'OPEN', '35', '36', '开启', null, null, '0', '2018-05-16 12:41:59');
INSERT INTO pro_dictionary_info VALUES ('37', 'ALARM_FLAG', 'CLOSE', '35', '37', '关闭', null, null, '0', '2018-05-16 12:42:12');


INSERT INTO pro_dictionary_info VALUES ('38', '', 'ALARM_LEVEL', null, '38', '报警级别', null, null, '0', '2018-05-16 12:42:38');
INSERT INTO pro_dictionary_info VALUES ('39', 'ALARM_LEVEL', 'SERIOUS', '38', '39', '严重', null, null, '0', '2018-05-16 12:44:36');
INSERT INTO pro_dictionary_info VALUES ('40', 'ALARM_LEVEL', 'URGENT', '38', '40', '紧急', null, null, '0', '2018-05-16 12:44:52');
INSERT INTO pro_dictionary_info VALUES ('41', 'ALARM_LEVEL', 'NORMAL', '38', '41', '一般', null, null, '0', '2018-05-16 12:45:04');


INSERT INTO pro_dictionary_info VALUES ('42', '', 'STATUS', null, '42', '启停状态', null, null, '0', '2018-05-16 12:45:42');
INSERT INTO pro_dictionary_info VALUES ('43', 'STATUS', 'NORMAL', '42', '43', '正常', null, null, '0', '2018-05-16 12:45:56');
INSERT INTO pro_dictionary_info VALUES ('44', 'STATUS', 'STOP', '42', '44', '暂停', null, null, '0', '2018-05-16 12:46:06');


INSERT INTO pro_dictionary_info VALUES ('45', '', 'PROCESS_STATUS', null, '45', '处理标志', null, null, '0', '2018-05-16 12:46:35');
INSERT INTO pro_dictionary_info VALUES ('46', 'PROCESS_STATUS', 'NO', '45', '46', '未处理', null, null, '0', '2018-05-16 12:47:00');
INSERT INTO pro_dictionary_info VALUES ('47', 'PROCESS_STATUS', 'YES', '45', '47', '已处理', null, null, '0', '2018-05-16 12:47:11');
INSERT INTO pro_dictionary_info VALUES ('48', 'PROCESS_STATUS', 'TAGGING', '45', '48', '已标注', null, null, '0', '2018-05-16 12:47:46');


INSERT INTO pro_dictionary_info VALUES ('49', '', 'ACTION_TYPE', null, '49', '触发动作类型', null, null, '0', '2018-05-16 16:01:02');
INSERT INTO pro_dictionary_info VALUES ('50', 'ACTION_TYPE', 'CONTROL_DEVICE', '49', '50', '控制设备', null, null, '0', '2018-05-16 16:01:02');
INSERT INTO pro_dictionary_info VALUES ('51', 'ACTION_TYPE', 'MESSAGE_WECHAT', '49', '51', '微信通知', null, null, '0', '2018-09-02 10:43:03');
INSERT INTO pro_dictionary_info VALUES ('52', 'ACTION_TYPE', 'MESSAGE_SMS', '49', '52', '短信通知', null, null, '0', '2018-09-02 10:42:58');
INSERT INTO pro_dictionary_info VALUES ('53', 'ACTION_TYPE', 'MESSAGE_MAIL', '49', '53', '邮件通知', null, null, '1', '2018-05-16 16:01:15');
INSERT INTO pro_dictionary_info VALUES ('360', 'ACTION_TYPE', 'MESSAGE_VOICE', '49', '360', '语音通知', null, null, '0', '2020-02-16 16:01:15');


INSERT INTO pro_dictionary_info VALUES ('54', '', 'SEX', null, '54', '性别', null, null, '0', '2018-05-17 10:52:18');
INSERT INTO pro_dictionary_info VALUES ('55', 'SEX', 'MALE', '54', '55', '男', null, null, '0', '2018-05-17 10:52:29');
INSERT INTO pro_dictionary_info VALUES ('56', 'SEX', 'FEMAIL', '54', '56', '女', null, null, '0', '2018-05-17 10:52:39');
INSERT INTO pro_dictionary_info VALUES ('57', 'SEX', 'UNKNOW', '54', '57', '未知', null, null, '0', '2018-05-17 10:53:10');


INSERT INTO pro_dictionary_info VALUES ('58', '', 'USER_STATUS', null, '58', '用户状态', null, null, '0', '2018-05-18 20:04:50');
INSERT INTO pro_dictionary_info VALUES ('59', 'USER_STATUS', 'UN_ACTIVED', '58', '59', '未激活', null, null, '0', '2018-05-18 20:05:20');
INSERT INTO pro_dictionary_info VALUES ('60', 'USER_STATUS', 'NORMAL', '58', '60', '正常', null, null, '0', '2018-05-18 20:05:34');
INSERT INTO pro_dictionary_info VALUES ('61', 'USER_STATUS', 'FORBIDDEN', '58', '61', '禁用', null, null, '0', '2018-05-18 20:06:12');


INSERT INTO pro_dictionary_info VALUES ('78', '', 'VIDEO_INPUT_TYPE', NULL, '78', '视频接入类型', '', NULL, '0', '2018-11-01 22:44:16');
INSERT INTO pro_dictionary_info VALUES ('79', 'VIDEO_INPUT_TYPE', 'AUTO_INPUT', '78', '79', '远程推流', '', NULL, '1', '2018-11-01 22:49:58');
INSERT INTO pro_dictionary_info VALUES ('80', 'VIDEO_INPUT_TYPE', 'HIK_INPUT', '78', '80', '萤石云转发', '', NULL, '0', '2018-11-01 22:47:50');
INSERT INTO pro_dictionary_info VALUES ('85', 'VIDEO_INPUT_TYPE', 'SERVER_PULL', '78', '85', '服务器拉流', '', NULL, '1', '2018-11-09 22:56:49');


INSERT INTO pro_dictionary_info VALUES ('81', '', 'IOT_NODE_TYPE', NULL, '81', '网关协议类型', '', NULL, '0', '2018-11-07 22:01:02');
INSERT INTO pro_dictionary_info VALUES ('82', 'IOT_NODE_TYPE', 'HTTP', '81', '82', 'HTTP', '', NULL, '1', '2018-11-07 22:02:03');
INSERT INTO pro_dictionary_info VALUES ('83', 'IOT_NODE_TYPE', 'TCP', '81', '83', 'TCP', '', NULL, '0', '2018-11-07 22:01:50');
INSERT INTO pro_dictionary_info VALUES ('84', 'IOT_NODE_TYPE', 'MQTT', '81', '84', 'MQTT', '', NULL, '0', '2018-11-07 22:01:57');
INSERT INTO pro_dictionary_info VALUES ('105', 'IOT_NODE_TYPE', 'UDP', '81', '105', 'UDP', '', NULL, '1', '2018-11-07 22:02:03');
INSERT INTO pro_dictionary_info VALUES ('106', 'IOT_NODE_TYPE', '电信NBIOT', '81', '106', '电信NBIOT', '', NULL, '1', '2020-12-14 22:02:03');


INSERT INTO pro_dictionary_info VALUES ('87', '', 'INFO_TYPE', NULL, '87', '信息类型', '', NULL, '0', '2018-12-23 22:07:53');
INSERT INTO pro_dictionary_info VALUES ('88', 'INFO_TYPE', 'COMMON', '87', '88', '正常', '', NULL, '0', '2018-12-23 22:08:19');
INSERT INTO pro_dictionary_info VALUES ('89', 'INFO_TYPE', 'TEMPLATE', '87', '89', '模板', '', NULL, '0', '2018-12-23 22:08:34');


INSERT INTO pro_dictionary_info VALUES ('96', '', 'PARAM_DATA_TYPE', NULL, '96', '参数配置类型', '', NULL, '0', '2019-03-23 22:25:26');


INSERT INTO pro_dictionary_info VALUES ('200', '', 'IOT_PROTOCOL_CATEGORY', null, '300', '数据协议类型', null, null, '0', '2019-10-29 12:35:23');
INSERT INTO pro_dictionary_info VALUES ('201', 'IOT_PROTOCOL_CATEGORY', 'ProtocalYinTlink', '300', '301', '烽源智能协议', '', '3', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('202', 'IOT_PROTOCOL_CATEGORY', 'ProtocalModbus', '300', '302', 'Modbus RTU', '', '2', '0', '2019-10-29 12:35:24');
INSERT INTO pro_dictionary_info VALUES ('203', 'IOT_PROTOCOL_CATEGORY', 'ProtocalHj212', '300', '303', '环境212标准协议', '', '4', '0', '2019-10-29 12:35:34');
INSERT INTO pro_dictionary_info VALUES ('204', 'IOT_PROTOCOL_CATEGORY', 'ProtocalYinTlink', '300', '304', '其他', '',       '5', '1', '2019-10-29 12:35:34');
INSERT INTO pro_dictionary_info VALUES ('205', 'IOT_PROTOCOL_CATEGORY', 'ProtocalMing', '300', '305', '小名智能协议', '',      '1', '0', '2019-10-29 12:35:34');
INSERT INTO pro_dictionary_info VALUES ('206', 'IOT_PROTOCOL_CATEGORY', 'ProtocalModbusTcp', '300', '306', 'MBTCP', '', '6', '0', '2019-10-29 12:35:24');

INSERT INTO pro_dictionary_info VALUES ('270', '', 'STORAGE_STRATEGY', null, '270', '数据储存策略', null, null, '0', '2020-03-13 00:00:00');
INSERT INTO pro_dictionary_info VALUES ('271', 'STORAGE_STRATEGY', 'CHANGE', '270', '271', '变化储存', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('272', 'STORAGE_STRATEGY', 'ALLWAYS', '270', '272', '实时储存', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('273', 'STORAGE_STRATEGY', '30SEC', '270', '273', '30s', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('274', 'STORAGE_STRATEGY', '1MIN', '270', '274', '1min', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('275', 'STORAGE_STRATEGY', '5MIN', '270', '275', '5min', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('276', 'STORAGE_STRATEGY', '10MIN', '270', '276', '10min', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('277', 'STORAGE_STRATEGY', '30MIN', '270', '277', '30min', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('278', 'STORAGE_STRATEGY', '1H', '270', '278', '1h', '', '2', '0', '2019-10-29 12:35:54');
INSERT INTO pro_dictionary_info VALUES ('279', 'STORAGE_STRATEGY', '1DAY', '270', '279', '1day', '', '2', '0', '2019-10-29 12:35:54');

-- 摄像头类型
INSERT INTO pro_dictionary_info VALUES ('281', '', 'CAMERA_TYPE', null, '281', '摄像头类型', null, null, '0', '2020-04-01 00:00:00');
INSERT INTO pro_dictionary_info VALUES ('282', 'CAMERA_TYPE', 'CAMERA_TYPE_HIKANG', '281', '282', '海康', null, null, '0', '2020-04-01 00:00:00');
INSERT INTO pro_dictionary_info VALUES ('283', 'CAMERA_TYPE', 'CAMERA_TYPE_DAHUA', '281', '283', '大华', null, null, '0', '2020-04-01 00:00:00');
INSERT INTO pro_dictionary_info VALUES ('284', 'CAMERA_TYPE', 'CAMERA_TYPE_YUSHI', '281', '284', '宇视', null, null, '0', '2020-04-01 00:00:00');

-- 组态的分类 129-148

-- 门禁的类型 150 - 155



