/*
 Navicat Premium Data Transfer

 Source Server         : 本机
 Source Server Type    : MySQL
 Source Server Version : 80035
 Source Host           : localhost:3306
 Source Schema         : military_ml

 Target Server Type    : MySQL
 Target Server Version : 80035
 File Encoding         : 65001

 Date: 26/11/2023 11:15:22
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for ms_device_info
-- ----------------------------
DROP TABLE IF EXISTS `ms_device_info`;
CREATE TABLE `ms_device_info`  (
  `id` varchar(36) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NOT NULL,
  `create_by` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '创建人',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建日期',
  `update_by` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '更新人',
  `update_time` datetime NULL DEFAULT NULL COMMENT '更新日期',
  `sys_org_code` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '所属部门',
  `device_type` int NULL DEFAULT NULL COMMENT '设备类型',
  `device_comp` int NULL DEFAULT NULL COMMENT '设备厂商',
  `device_name` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '设备名称',
  `device_num` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '设备编号',
  `ip` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '设备IP',
  `port` int NULL DEFAULT NULL COMMENT '监听/通信端口',
  `ip2` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '备用IP',
  `port2` int NULL DEFAULT NULL COMMENT '备用端口',
  `state` int NULL DEFAULT NULL COMMENT '启用状态',
  `lon` double NULL DEFAULT 0 COMMENT '设备经度',
  `lat` double NULL DEFAULT 0 COMMENT '设备纬度',
  `height` double NULL DEFAULT 0 COMMENT '设备高度',
  `init_azimuth` double NULL DEFAULT 0 COMMENT '初始方位角',
  `init_pitch` double NULL DEFAULT 0 COMMENT '初始俯仰角',
  `username` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '认证用户名',
  `password` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '认证密码',
  `day_begin_time` varchar(10) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '白光开始时间',
  `day_end_time` varchar(10) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '白光结束时间',
  `relate_type` int NULL DEFAULT NULL COMMENT '关联设备类型',
  `relate_id` varchar(36) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '关联设备id',
  `alive_time` datetime NULL DEFAULT NULL COMMENT '心跳更新时间',
  `field2` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '备用2',
  `field3` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '备用3',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_device_num`(`device_type`, `device_comp`, `device_num`) USING BTREE,
  INDEX `idx_ip`(`ip`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb3 COLLATE = utf8mb3_general_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of ms_device_info
-- ----------------------------
INSERT INTO `ms_device_info` VALUES ('1568120387246149633', NULL, '2022-09-09 14:13:29', NULL, '2022-10-06 13:46:35', NULL, 1, 2, '雷达1', '1', '192.168.1.86', 8100, NULL, NULL, 1, 113.455074, 22.122197, 7.5, 109.6, 0, NULL, NULL, NULL, NULL, 2, '1568120387292286999', '2022-10-06 13:46:35', NULL, NULL);
INSERT INTO `ms_device_info` VALUES ('1568120387292286978', NULL, '2022-09-09 14:13:29', NULL, '2022-09-27 15:41:55', NULL, 3, 3, '电子围网1', 'fence1', '192.168.1.86', 8003, NULL, NULL, 1, 0, 0, 0, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, NULL, NULL);
INSERT INTO `ms_device_info` VALUES ('1568120387292286999', NULL, NULL, NULL, NULL, NULL, 2, NULL, '光电1', NULL, '192.168.20.76', NULL, NULL, NULL, 1, 0, 0, 8, 0, 0, 'admin', 'Abc.12345', NULL, NULL, NULL, NULL, NULL, NULL, NULL);

SET FOREIGN_KEY_CHECKS = 1;
